\null
\setlength{\headheight}{0cm}
\setlength{\headsep}{0cm}
\setlength{\textheight}{21.6cm}
\setlength{\footskip}{0cm}
\pagestyle{empty}
\begin{center}
\halftitle{}\\
\end{center}
\vfill
{\footnotesize
%RR  \noindent{\itshape COVER ILLUSTRATION\/:\ }\\ \hfill\\\blurb{}}
\noindent{\itshape COVER ILLUSTRATION: ~\blurb{}}}  %RR stupid way 
%RR should be italics since all photopages have italics captions
\pagebreak
